%   EPSF.TEX macro file:
%   Written by Tomas Rokicki of Radical Eye Software, 29 Mar 1989.
%   Revised by Don Knuth, 3 Jan 1990.
%   Revised by Tomas Rokicki to accept bounding boxes with no
%      space after the colon, 18 Jul 1990.
%
%   TeX macros to include an Encapsulated PostScript graphic.
%   Works by finding the bounding box comment,
%   calculating the correct scale values, and inserting a vbox
%   of the appropriate size at the current position in the TeX document.
%
%   To use with the center environment of LaTeX, preface the \epsffile
%   call with a \leavevmode.  (LaTeX should probably supply this itself
%   for the center environment.)
%
%   To use, simply say
%   \input epsf           % somewhere early on in your TeX file
%   \epsfbox{filename.ps} % where you want to insert a vbox for a figure
%
%   Alternatively, you can type
%
%   \epsfbox[0 0 30 50]{filename.ps} % to supply your own BB
%
%   which will not read in the file, and will instead use the bounding
%   box you specify.
%
%   The effect will be to typeset the figure as a TeX box, at the
%   point of your \epsfbox command. By default, the graphic will have its
%   `natural' width (namely the width of its bounding box, as described
%   in filename.ps). The TeX box will have depth zero.
%
%   You can enlarge or reduce the figure by saying
%     \epsfxsize=<dimen> \epsfbox{filename.ps}
%   (or
%     \epsfysize=<dimen> \epsfbox{filename.ps})
%   instead. Then the width of the TeX box will be \epsfxsize and its
%   height will be scaled proportionately (or the height will be
%   \epsfysize and its width will be scaled proportiontally).  The
%   width (and height) is restored to zero after each use.
%
%   A more general facility for sizing is available by defining the
%   \epsfsize macro.    Normally you can redefine this macro
%   to do almost anything.  The first parameter is the natural x size of
%   the PostScript graphic, the second parameter is the natural y size
%   of the PostScript graphic.  It must return the xsize to use, or 0 if
%   natural scaling is to be used.  Common uses include:
%
%      \epsfxsize  % just leave the old value alone
%      0pt         % use the natural sizes
%      #1          % use the natural sizes
%      \hsize      % scale to full width
%      0.5#1       % scale to 50% of natural size
%      \ifnum#1>\hsize\hsize\else#1\fi  % smaller of natural, hsize
%
%   If you want TeX to report the size of the figure (as a message
%   on your terminal when it processes each figure), say `\epsfverbosetrue'.
%
\newread\epsffilein    % file to \read
\newif\ifepsffileok    % continue looking for the bounding box?
\newif\ifepsfbbfound   % success?
\newif\ifepsfverbose   % report what you're making?
\newif\ifepsfdraft     % use draft mode?
\newdimen\epsfxsize    % horizontal size after scaling
\newdimen\epsfysize    % vertical size after scaling
\newdimen\epsftsize    % horizontal size before scaling
\newdimen\epsfrsize    % vertical size before scaling
\newdimen\epsftmp      % register for arithmetic manipulation
\newdimen\pspoints     % conversion factor
%
\pspoints=1bp          % Adobe points are `big'
\epsfxsize=0pt         % Default value, means `use natural size'
\epsfysize=0pt         % ditto
%
\def\epsfbox#1{\global\def\epsfllx{72}\global\def\epsflly{72}%
   \global\def\epsfurx{540}\global\def\epsfury{720}%
   \def\lbracket{[}\def\testit{#1}\ifx\testit\lbracket
   \let\next=\epsfgetlitbb\else\let\next=\epsfnormal\fi\next{#1}}%
%
\def\epsfgetlitbb#1#2 #3 #4 #5]#6{\epsfgrab #2 #3 #4 #5 .\\%
   \epsfsetgraph{#6}}%
%
\def\epsfnormal#1{\epsfgetbb{#1}\epsfsetgraph{#1}}%
%
\def\epsfgetbb#1{%
%
%   The first thing we need to do is to open the
%   PostScript file, if possible.
%
\openin\epsffilein=#1
\ifeof\epsffilein\errmessage{I couldn't open #1, will ignore it}\else
%
%   Okay, we got it. Now we'll scan lines until we find one that doesn't
%   start with %. We're looking for the bounding box comment.
%
   {\epsffileoktrue \chardef\other=12
    \def\do##1{\catcode`##1=\other}\dospecials \catcode`\ =10
    \loop
       \read\epsffilein to \epsffileline
       \ifeof\epsffilein\epsffileokfalse\else
%
%   We check to see if the first character is a % sign;
%   if not, we stop reading (unless the line was entirely blank);
%   if so, we look further and stop only if the line begins with
%   `%%BoundingBox:'.
%
          \expandafter\epsfaux\epsffileline:. \\%
       \fi
   \ifepsffileok\repeat
   \ifepsfbbfound\else
    \ifepsfverbose\message{No bounding box comment in #1; using defaults}\fi\fi
   }\closein\epsffilein\fi}%
%
%   Now we have to calculate the scale and offset values to use.
%   First we compute the natural sizes.
%
\def\epsfclipon{\def\epsfclipstring{ clip}}%
\def\epsfclipoff{\def\epsfclipstring{\ifepsfdraft\space clip\fi}}%
\epsfclipoff
%
\def\epsfsetgraph#1{%
   \epsfrsize=\epsfury\pspoints
   \advance\epsfrsize by-\epsflly\pspoints
   \epsftsize=\epsfurx\pspoints
   \advance\epsftsize by-\epsfllx\pspoints
%
%   If `epsfxsize' is 0, we default to the natural size of the picture.
%   Otherwise we scale the graph to be \epsfxsize wide.
%
   \epsfxsize\epsfsize\epsftsize\epsfrsize
   \ifnum\epsfxsize=0 \ifnum\epsfysize=0
      \epsfxsize=\epsftsize \epsfysize=\epsfrsize
      \epsfrsize=0pt
%
%   We have a sticky problem here:  TeX doesn't do floating point arithmetic!
%   Our goal is to compute y = rx/t. The following loop does this reasonably
%   fast, with an error of at most about 16 sp (about 1/4000 pt).
%
     \else\epsftmp=\epsftsize \divide\epsftmp\epsfrsize
       \epsfxsize=\epsfysize \multiply\epsfxsize\epsftmp
       \multiply\epsftmp\epsfrsize \advance\epsftsize-\epsftmp
       \epsftmp=\epsfysize
       \loop \advance\epsftsize\epsftsize \divide\epsftmp 2
       \ifnum\epsftmp>0
          \ifnum\epsftsize<\epsfrsize\else
             \advance\epsftsize-\epsfrsize \advance\epsfxsize\epsftmp \fi
       \repeat
       \epsfrsize=0pt
     \fi
   \else \ifnum\epsfysize=0
     \epsftmp=\epsfrsize \divide\epsftmp\epsftsize
     \epsfysize=\epsfxsize \multiply\epsfysize\epsftmp
     \multiply\epsftmp\epsftsize \advance\epsfrsize-\epsftmp
     \epsftmp=\epsfxsize
     \loop \advance\epsfrsize\epsfrsize \divide\epsftmp 2
     \ifnum\epsftmp>0
        \ifnum\epsfrsize<\epsftsize\else
           \advance\epsfrsize-\epsftsize \advance\epsfysize\epsftmp \fi
     \repeat
     \epsfrsize=0pt
    \else
     \epsfrsize=\epsfysize
    \fi
   \fi
%
%  Finally, we make the vbox and stick in a \special that dvips can parse.
%
   \ifepsfverbose\message{#1: width=\the\epsfxsize, height=\the\epsfysize}\fi
   \epsftmp=10\epsfxsize \divide\epsftmp\pspoints
   \vbox to\epsfysize{\vfil\hbox to\epsfxsize{%
      \ifnum\epsfrsize=0\relax
        \special{PSfile=\ifepsfdraft psdraft.ps\else#1\fi\space
             llx=\epsfllx\space lly=\epsflly\space
             urx=\epsfurx\space ury=\epsfury\space rwi=\number\epsftmp
             \epsfclipstring}%
      \else
        \epsfrsize=10\epsfysize \divide\epsfrsize\pspoints
        \special{PSfile=\ifepsfdraft psdraft.ps\else#1\fi\space
             llx=\epsfllx\space lly=\epsflly\space
             urx=\epsfurx\space ury=\epsfury\space rwi=\number\epsftmp\space
             rhi=\number\epsfrsize \epsfclipstring}%
      \fi
      \hfil}}%
\global\epsfxsize=0pt\global\epsfysize=0pt}%
%
%   We still need to define the tricky \epsfaux macro. This requires
%   a couple of magic constants for comparison purposes.
%
{\catcode`\%=12 \global\let\epsfpercent=%\global\def\epsfbblit{%BoundingBox}}%
%
%   So we're ready to check for `%BoundingBox:' and to grab the
%   values if they are found.
%
\long\def\epsfaux#1#2:#3\\{\ifx#1\epsfpercent
   \def\testit{#2}\ifx\testit\epsfbblit
      \epsfgrab #3 . . . \\%
      \epsffileokfalse
      \global\epsfbbfoundtrue
   \fi\else\ifx#1\par\else\epsffileokfalse\fi\fi}%
%
%   Here we grab the values and stuff them in the appropriate definitions.
%
\def\epsfempty{}%
\def\epsfgrab #1 #2 #3 #4 #5\\{%
\global\def\epsfllx{#1}\ifx\epsfllx\epsfempty
      \epsfgrab #2 #3 #4 #5 .\\\else
   \global\def\epsflly{#2}%
   \global\def\epsfurx{#3}\global\def\epsfury{#4}\fi}%
%
%   We default the epsfsize macro.
%
\def\epsfsize#1#2{\epsfxsize}
%
%   Finally, another definition for compatibility with older macros.
%
\let\epsffile=\epsfbox




